Threshold

0 50 100 150 200 250

NHits

1

10

210

310

hHitsInBtByThreshold

Entries 256000 Mean x 127.5 Mean y 1502 RMS x 73.9 RMS y 1452 Integral 2.56e+05 0 0 0 0 256000 0 0 0 0

Hits in BT by threshold