-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE0, Chip 0, ADC distribution FE0Chip00All

Entries 323352 Mean 1661 RMS 5341 Underflow 0 Overflow 0

FE0, Chip 0, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE0, Chip 0, ADC distribution FE0Chip00Ped

Entries 323352 Mean -4.931 RMS 1.315 Underflow 0 Overflow 2.92e+04

FE0, Chip 0, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310

FE0, Chip 0, ADC distribution FE0Chip00Sig

Entries 323352 Mean 1.882e+04 RMS 39.19 Underflow 3.146e+05 Overflow 0

FE0, Chip 0, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE0, Chip 1, ADC distribution FE0Chip01All

Entries 323352 Mean 1677 RMS 5300 Underflow 0 Overflow 0

FE0, Chip 1, ADC distribution

10

210

310

410

510 FE0, Chip 1, ADC distribution FE0Chip01Ped

Entries 323352 Mean 23.84 RMS 1.344 Underflow 0 Overflow 3.019e+04

FE0, Chip 1, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE0, Chip 1, ADC distribution FE0Chip01Sig

Entries 323352 Mean 1.885e+04 RMS 19.69 Underflow 3.221e+05 Overflow 0

FE0, Chip 1, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE0, Chip 2, ADC distribution FE0Chip02All

Entries 323352 Mean 1703 RMS 5372 Underflow 0 Overflow 0

FE0, Chip 2, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE0, Chip 2, ADC distribution FE0Chip02Ped

Entries 323352 Mean 15.38 RMS 2.297 Underflow 0 Overflow 2.914e+04

FE0, Chip 2, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310

FE0, Chip 2, ADC distribution FE0Chip02Sig

Entries 323352 Mean 1.882e+04 RMS 18.77 Underflow 2.969e+05 Overflow 0

FE0, Chip 2, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE0, Chip 3, ADC distribution FE0Chip03All

Entries 323352 Mean 1662 RMS 5324 Underflow 0 Overflow 0

FE0, Chip 3, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE0, Chip 3, ADC distribution FE0Chip03Ped

Entries 323352 Mean 2.073 RMS 1.876 Underflow 0 Overflow 2.902e+04

FE0, Chip 3, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE0, Chip 3, ADC distribution FE0Chip03Sig

Entries 323352 Mean 1.882e+04 RMS 6.986 Underflow 3.22e+05 Overflow 0

FE0, Chip 3, ADC distribution

-5000 0 5000 10000 15000 20000 25000

10

210

310

410

510

FE0, Chip 4, ADC distribution FE0Chip04All

Entries 323352 Mean 1643 RMS 5325 Underflow 0 Overflow 0

FE0, Chip 4, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE0, Chip 4, ADC distribution FE0Chip04Ped

Entries 323352 Mean -10.89 RMS 3.981 Underflow 0 Overflow 2.866e+04

FE0, Chip 4, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE0, Chip 4, ADC distribution FE0Chip04Sig

Entries 323352 Mean 1.882e+04 RMS 24.06 Underflow 3.195e+05 Overflow 0

FE0, Chip 4, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE0, Chip 5, ADC distribution FE0Chip05All

Entries 323352 Mean 1646 RMS 5309 Underflow 0 Overflow 0

FE0, Chip 5, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE0, Chip 5, ADC distribution FE0Chip05Ped

Entries 323352 Mean -3.908 RMS 2.568 Underflow 0 Overflow 2.89e+04

FE0, Chip 5, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE0, Chip 5, ADC distribution FE0Chip05Sig

Entries 323352 Mean 1.88e+04 RMS 5.254 Underflow 3.226e+05 Overflow 0

FE0, Chip 5, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE0, Chip 6, ADC distribution FE0Chip06All

Entries 323352 Mean 1700 RMS 5333 Underflow 0 Overflow 0

FE0, Chip 6, ADC distribution

10

210

310

410

510

FE0, Chip 6, ADC distribution FE0Chip06Ped

Entries 323352 Mean 22.77 RMS 1.274 Underflow 0 Overflow 2.952e+04

FE0, Chip 6, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE0, Chip 6, ADC distribution FE0Chip06Sig

Entries 323352 Mean 1.881e+04 RMS 9.789 Underflow 3.226e+05 Overflow 0

FE0, Chip 6, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE0, Chip 7, ADC distribution FE0Chip07All

Entries 323352 Mean 1660 RMS 5299 Underflow 0 Overflow 0

FE0, Chip 7, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE0, Chip 7, ADC distribution FE0Chip07Ped

Entries 323352 Mean 9.166 RMS 1.35 Underflow 0 Overflow 2.907e+04

FE0, Chip 7, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210 FE0, Chip 7, ADC distribution FE0Chip07Sig

Entries 323352 Mean 1.881e+04 RMS 7.686 Underflow 3.229e+05 Overflow 0

FE0, Chip 7, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE0, Chip 8, ADC distribution FE0Chip08All

Entries 323352 Mean 1679 RMS 5346 Underflow 0 Overflow 0

FE0, Chip 8, ADC distribution

10

210

310

410

510 FE0, Chip 8, ADC distribution FE0Chip08Ped

Entries 323352 Mean -4.043 RMS 1.913 Underflow 0 Overflow 2.916e+04

FE0, Chip 8, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE0, Chip 9, ADC distribution FE0Chip09All

Entries 323352 Mean 1653 RMS 5321 Underflow 0 Overflow 0

FE0, Chip 9, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE0, Chip 9, ADC distribution FE0Chip09Ped

Entries 323352 Mean 0.7492 RMS 1.546 Underflow 0 Overflow 2.902e+04

FE0, Chip 9, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310 FE0, Chip 9, ADC distribution FE0Chip09Sig

Entries 323352 Mean 1.882e+04 RMS 17.22 Underflow 3.193e+05 Overflow 0

FE0, Chip 9, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE0, Chip 10, ADC distribution FE0Chip10All

Entries 323352 Mean 1650 RMS 5300 Underflow 0 Overflow 0

FE0, Chip 10, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE0, Chip 10, ADC distribution FE0Chip10Ped

Entries 323352 Mean 3.063 RMS 1.662 Underflow 0 Overflow 2.902e+04

FE0, Chip 10, ADC distribution

-5000 0 5000 10000 15000 20000 25000

10

210

310

410

510

FE0, Chip 11, ADC distribution FE0Chip11All

Entries 323352 Mean 1646 RMS 5299 Underflow 0 Overflow 0

FE0, Chip 11, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE0, Chip 11, ADC distribution FE0Chip11Ped

Entries 323352 Mean 1.125 RMS 1.785 Underflow 0 Overflow 2.902e+04

FE0, Chip 11, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE1, Chip 0, ADC distribution FE1Chip00All

Entries 323352 Mean 1553 RMS 5180 Underflow 0 Overflow 0

FE1, Chip 0, ADC distribution

210

310

410

510

FE1, Chip 0, ADC distribution FE1Chip00Ped

Entries 323352 Mean -6.164 RMS 1.317 Underflow 0 Overflow 2.713e+04

FE1, Chip 0, ADC distribution

-5000 0 5000 10000 15000 20000 25000 210

310

410

510

FE1, Chip 1, ADC distribution FE1Chip01All

Entries 323352 Mean 1599 RMS 5206 Underflow 0 Overflow 0

FE1, Chip 1, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 10

210

310

410

510

FE1, Chip 1, ADC distribution FE1Chip01Ped

Entries 323352 Mean 24.18 RMS 1.356 Underflow 0 Overflow 2.849e+04

FE1, Chip 1, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310

FE1, Chip 1, ADC distribution FE1Chip01Sig

Entries 323352 Mean 1.887e+04 RMS 6.33 Underflow 2.964e+05 Overflow 0

FE1, Chip 1, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE1, Chip 2, ADC distribution FE1Chip02All

Entries 323352 Mean 1703 RMS 5390 Underflow 0 Overflow 0

FE1, Chip 2, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510

FE1, Chip 2, ADC distribution FE1Chip02Ped

Entries 323352 Mean 2.541 RMS 1.315 Underflow 0 Overflow 2.934e+04

FE1, Chip 2, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310 FE1, Chip 2, ADC distribution FE1Chip02Sig

Entries 323352 Mean 1.884e+04 RMS 6.605 Underflow 3.209e+05 Overflow 0

FE1, Chip 2, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE1, Chip 3, ADC distribution FE1Chip03All

Entries 323352 Mean 1704 RMS 5376 Underflow 0 Overflow 0

FE1, Chip 3, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE1, Chip 3, ADC distribution FE1Chip03Ped

Entries 323352 Mean 5.382 RMS 1.313 Underflow 0 Overflow 2.934e+04

FE1, Chip 3, ADC distribution

18800 18900 19000 19100 19200 19300 19400

1

10

FE1, Chip 3, ADC distribution FE1Chip03Sig

Entries 323352 Mean 1.881e+04 RMS 5.223 Underflow 3.233e+05 Overflow 0

FE1, Chip 3, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE1, Chip 4, ADC distribution FE1Chip04All

Entries 323352 Mean 1715 RMS 5414 Underflow 0 Overflow 0

FE1, Chip 4, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE1, Chip 4, ADC distribution FE1Chip04Ped

Entries 323352 Mean -9.929 RMS 1.287 Underflow 0 Overflow 2.981e+04

FE1, Chip 4, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210 FE1, Chip 4, ADC distribution FE1Chip04Sig

Entries 323352 Mean 1.883e+04 RMS 14.11 Underflow 3.229e+05 Overflow 0

FE1, Chip 4, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE1, Chip 5, ADC distribution FE1Chip05All

Entries 323352 Mean 1730 RMS 5393 Underflow 0 Overflow 0

FE1, Chip 5, ADC distribution

10

210

310

410

510

FE1, Chip 5, ADC distribution FE1Chip05Ped

Entries 323352 Mean 10.9 RMS 1.284 Underflow 0 Overflow 2.983e+04

FE1, Chip 5, ADC distribution

18800 18900 19000 19100 19200 19300 19400

1

10

FE1, Chip 5, ADC distribution FE1Chip05Sig

Entries 323352 Mean 1.881e+04 RMS 4.313 Underflow 3.233e+05 Overflow 0

FE1, Chip 5, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE1, Chip 6, ADC distribution FE1Chip06All

Entries 323352 Mean 1537 RMS 5154 Underflow 0 Overflow 0

FE1, Chip 6, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE1, Chip 6, ADC distribution FE1Chip06Ped

Entries 323352 Mean -18.49 RMS 1.396 Underflow 0 Overflow 2.756e+04

FE1, Chip 6, ADC distribution

-5000 0 5000 10000 15000 20000 25000 210

310

410

510

FE1, Chip 7, ADC distribution FE1Chip07All

Entries 323352 Mean 1547 RMS 5148 Underflow 0 Overflow 0

FE1, Chip 7, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 10

210

310

410

510

FE1, Chip 7, ADC distribution FE1Chip07Ped

Entries 323352 Mean -11.54 RMS 1.325 Underflow 0 Overflow 2.858e+04

FE1, Chip 7, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE1, Chip 8, ADC distribution FE1Chip08All

Entries 323352 Mean 1710 RMS 5373 Underflow 0 Overflow 0

FE1, Chip 8, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE1, Chip 8, ADC distribution FE1Chip08Ped

Entries 323352 Mean 15.07 RMS 1.316 Underflow 0 Overflow 2.934e+04

FE1, Chip 8, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310 FE1, Chip 8, ADC distribution FE1Chip08Sig

Entries 323352 Mean 1.88e+04 RMS 4.306 Underflow 3.217e+05 Overflow 0

FE1, Chip 8, ADC distribution

-5000 0 5000 10000 15000 20000 25000

210

310

410

510

FE1, Chip 9, ADC distribution FE1Chip09All

Entries 323352 Mean 1705 RMS 5370 Underflow 0 Overflow 0

FE1, Chip 9, ADC distribution

10

210

310

410

510 FE1, Chip 9, ADC distribution FE1Chip09Ped

Entries 323352 Mean 9.142 RMS 1.337 Underflow 0 Overflow 2.934e+04

FE1, Chip 9, ADC distribution

18800 18900 19000 19100 19200 19300 19400

1

10

FE1, Chip 9, ADC distribution FE1Chip09Sig

Entries 323352 Mean 1.881e+04 RMS 1.397 Underflow 3.233e+05 Overflow 0

FE1, Chip 9, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE1, Chip 10, ADC distribution FE1Chip10All

Entries 323352 Mean 1714 RMS 5394 Underflow 0 Overflow 0

FE1, Chip 10, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE1, Chip 10, ADC distribution FE1Chip10Ped

Entries 323352 Mean -4.852 RMS 1.3 Underflow 0 Overflow 2.981e+04

FE1, Chip 10, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE1, Chip 11, ADC distribution FE1Chip11All

Entries 323352 Mean 1704 RMS 5400 Underflow 0 Overflow 0

FE1, Chip 11, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 10

210

310

410

510

FE1, Chip 11, ADC distribution FE1Chip11Ped

Entries 323352 Mean -15.55 RMS 1.36 Underflow 0 Overflow 2.983e+04

FE1, Chip 11, ADC distribution

-5000 0 5000 10000 15000 20000 25000

210

310

410

510

FE2, Chip 0, ADC distribution FE2Chip00All

Entries 323352 Mean 1549 RMS 5125 Underflow 0 Overflow 0

FE2, Chip 0, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE2, Chip 0, ADC distribution FE2Chip00Ped

Entries 323352 Mean 17.98 RMS 1.323 Underflow 0 Overflow 2.65e+04

FE2, Chip 0, ADC distribution

-5000 0 5000 10000 15000 20000 25000 210

310

410

510

FE2, Chip 1, ADC distribution FE2Chip01All

Entries 323352 Mean 1517 RMS 5139 Underflow 0 Overflow 0

FE2, Chip 1, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE2, Chip 1, ADC distribution FE2Chip01Ped

Entries 323352 Mean -18.16 RMS 1.309 Underflow 0 Overflow 2.65e+04

FE2, Chip 1, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE2, Chip 2, ADC distribution FE2Chip02All

Entries 323352 Mean 1549 RMS 5123 Underflow 0 Overflow 0

FE2, Chip 2, ADC distribution

10

210

310

410

510

FE2, Chip 2, ADC distribution FE2Chip02Ped

Entries 323352 Mean 18.43 RMS 1.323 Underflow 0 Overflow 2.65e+04

FE2, Chip 2, ADC distribution

-5000 0 5000 10000 15000 20000 25000

210

310

410

510

FE2, Chip 3, ADC distribution FE2Chip03All

Entries 323352 Mean 1541 RMS 5143 Underflow 0 Overflow 0

FE2, Chip 3, ADC distribution

10

210

310

410

510

FE2, Chip 3, ADC distribution FE2Chip03Ped

Entries 323352 Mean 4.085 RMS 1.33 Underflow 0 Overflow 2.65e+04

FE2, Chip 3, ADC distribution

18800 18900 19000 19100 19200 19300 19400

10

FE2, Chip 3, ADC distribution FE2Chip03Sig

Entries 323352 Mean 1.881e+04 RMS 6.733 Underflow 3.233e+05 Overflow 0

FE2, Chip 3, ADC distribution

-5000 0 5000 10000 15000 20000 25000 210

310

410

510

FE2, Chip 4, ADC distribution FE2Chip04All

Entries 323352 Mean 1526 RMS 5151 Underflow 0 Overflow 0

FE2, Chip 4, ADC distribution

210

310

410

510

FE2, Chip 4, ADC distribution FE2Chip04Ped

Entries 323352 Mean -12.9 RMS 1.325 Underflow 0 Overflow 2.65e+04

FE2, Chip 4, ADC distribution

18800 18900 19000 19100 19200 19300 19400

1

10

FE2, Chip 4, ADC distribution FE2Chip04Sig

Entries 323352 Mean 1.881e+04 RMS 8.859 Underflow 3.232e+05 Overflow 0

FE2, Chip 4, ADC distribution

-5000 0 5000 10000 15000 20000 25000

210

310

410

510

FE2, Chip 5, ADC distribution FE2Chip05All

Entries 323352 Mean 1506 RMS 5106 Underflow 0 Overflow 0

FE2, Chip 5, ADC distribution

10

210

310

410

510

FE2, Chip 5, ADC distribution FE2Chip05Ped

Entries 323352 Mean -19.91 RMS 1.315 Underflow 0 Overflow 2.65e+04

FE2, Chip 5, ADC distribution

-5000 0 5000 10000 15000 20000 25000

310

410

510

FE2, Chip 6, ADC distribution FE2Chip06All

Entries 323352 Mean 1518 RMS 5112 Underflow 0 Overflow 0

FE2, Chip 6, ADC distribution

10

210

310

410

510

FE2, Chip 6, ADC distribution FE2Chip06Ped

Entries 323352 Mean -9.153 RMS 1.293 Underflow 0 Overflow 2.65e+04

FE2, Chip 6, ADC distribution

-5000 0 5000 10000 15000 20000 25000

210

310

410

510

FE2, Chip 7, ADC distribution FE2Chip07All

Entries 323352 Mean 1533 RMS 5117 Underflow 0 Overflow 0

FE2, Chip 7, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE2, Chip 7, ADC distribution FE2Chip07Ped

Entries 323352 Mean 3.913 RMS 1.323 Underflow 0 Overflow 2.65e+04

FE2, Chip 7, ADC distribution

-5000 0 5000 10000 15000 20000 25000

310

410

510

FE2, Chip 8, ADC distribution FE2Chip08All

Entries 323352 Mean 1542 RMS 5135 Underflow 0 Overflow 0

FE2, Chip 8, ADC distribution

10

210

310

410

510

FE2, Chip 8, ADC distribution FE2Chip08Ped

Entries 323352 Mean 8.141 RMS 1.321 Underflow 0 Overflow 2.65e+04

FE2, Chip 8, ADC distribution

-5000 0 5000 10000 15000 20000 25000

210

310

410

510

FE2, Chip 9, ADC distribution FE2Chip09All

Entries 323352 Mean 1519 RMS 5134 Underflow 0 Overflow 0

FE2, Chip 9, ADC distribution

10

210

310

410

510 FE2, Chip 9, ADC distribution FE2Chip09Ped

Entries 323352 Mean -14.88 RMS 1.349 Underflow 0 Overflow 2.65e+04

FE2, Chip 9, ADC distribution

-5000 0 5000 10000 15000 20000 25000

210

310

410

510

FE2, Chip 10, ADC distribution FE2Chip10All

Entries 323352 Mean 1520 RMS 5096 Underflow 0 Overflow 0

FE2, Chip 10, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE2, Chip 10, ADC distribution FE2Chip10Ped

Entries 323352 Mean -2.564 RMS 1.208 Underflow 0 Overflow 2.65e+04

FE2, Chip 10, ADC distribution

-5000 0 5000 10000 15000 20000 25000

310

410

510

FE2, Chip 11, ADC distribution FE2Chip11All

Entries 323352 Mean 1523 RMS 5126 Underflow 0 Overflow 0

FE2, Chip 11, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE2, Chip 11, ADC distribution FE2Chip11Ped

Entries 323352 Mean -8.113 RMS 1.294 Underflow 0 Overflow 2.65e+04

FE2, Chip 11, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE3, Chip 0, ADC distribution FE3Chip00All

Entries 323352 Mean 1525 RMS 5114 Underflow 0 Overflow 0

FE3, Chip 0, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE3, Chip 0, ADC distribution FE3Chip00Ped

Entries 323352 Mean 1.715 RMS 1.312 Underflow 0 Overflow 2.687e+04

FE3, Chip 0, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210 FE3, Chip 0, ADC distribution FE3Chip00Sig

Entries 323352 Mean 1.881e+04 RMS 7.101 Underflow 3.23e+05 Overflow 0

FE3, Chip 0, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE3, Chip 1, ADC distribution FE3Chip01All

Entries 323352 Mean 1547 RMS 5150 Underflow 0 Overflow 0

FE3, Chip 1, ADC distribution

10

210

310

410

510

FE3, Chip 1, ADC distribution FE3Chip01Ped

Entries 323352 Mean 10.28 RMS 1.283 Underflow 0 Overflow 2.686e+04

FE3, Chip 1, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310

FE3, Chip 1, ADC distribution FE3Chip01Sig

Entries 323352 Mean 1.881e+04 RMS 14.39 Underflow 2.97e+05 Overflow 0

FE3, Chip 1, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE3, Chip 2, ADC distribution FE3Chip02All

Entries 323352 Mean 1526 RMS 5116 Underflow 0 Overflow 0

FE3, Chip 2, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE3, Chip 2, ADC distribution FE3Chip02Ped

Entries 323352 Mean 4.527 RMS 1.417 Underflow 0 Overflow 2.66e+04

FE3, Chip 2, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE3, Chip 3, ADC distribution FE3Chip03All

Entries 323352 Mean 1549 RMS 5139 Underflow 0 Overflow 0

FE3, Chip 3, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE3, Chip 3, ADC distribution FE3Chip03Ped

Entries 323352 Mean 12.05 RMS 1.406 Underflow 0 Overflow 2.655e+04

FE3, Chip 3, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE3, Chip 3, ADC distribution FE3Chip03Sig

Entries 323352 Mean 1.881e+04 RMS 1.966 Underflow 3.23e+05 Overflow 0

FE3, Chip 3, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE3, Chip 4, ADC distribution FE3Chip04All

Entries 323352 Mean 1550 RMS 5180 Underflow 0 Overflow 0

FE3, Chip 4, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE3, Chip 4, ADC distribution FE3Chip04Ped

Entries 323352 Mean 1.468 RMS 1.315 Underflow 0 Overflow 2.655e+04

FE3, Chip 4, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310

FE3, Chip 4, ADC distribution FE3Chip04Sig

Entries 323352 Mean 1.888e+04 RMS 12.56 Underflow 2.968e+05 Overflow 0

FE3, Chip 4, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE3, Chip 5, ADC distribution FE3Chip05All

Entries 323352 Mean 1541 RMS 5142 Underflow 0 Overflow 0

FE3, Chip 5, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 10

210

310

410

510

FE3, Chip 5, ADC distribution FE3Chip05Ped

Entries 323352 Mean 2.59 RMS 1.294 Underflow 0 Overflow 2.655e+04

FE3, Chip 5, ADC distribution

18800 18900 19000 19100 19200 19300 19400

-2 10

-1 10

1

10 FE3, Chip 5, ADC distribution FE3Chip05Sig

Entries 323352 Mean 1.88e+04 RMS 0.433 Underflow 3.233e+05 Overflow 0

FE3, Chip 5, ADC distribution

-5000 0 5000 10000 15000 20000 25000

210

310

410

510

FE3, Chip 6, ADC distribution FE3Chip06All

Entries 323352 Mean 1532 RMS 5147 Underflow 0 Overflow 0

FE3, Chip 6, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE3, Chip 6, ADC distribution FE3Chip06Ped

Entries 323352 Mean -2.832 RMS 1.293 Underflow 0 Overflow 2.687e+04

FE3, Chip 6, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310

FE3, Chip 6, ADC distribution FE3Chip06Sig

Entries 323352 Mean 1.881e+04 RMS 23.74 Underflow 3.159e+05 Overflow 0

FE3, Chip 6, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE3, Chip 7, ADC distribution FE3Chip07All

Entries 323352 Mean 1531 RMS 5124 Underflow 0 Overflow 0

FE3, Chip 7, ADC distribution

210

310

410

510

FE3, Chip 7, ADC distribution FE3Chip07Ped

Entries 323352 Mean 2.918 RMS 1.313 Underflow 0 Overflow 2.686e+04

FE3, Chip 7, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210 FE3, Chip 7, ADC distribution FE3Chip07Sig

Entries 323352 Mean 1.881e+04 RMS 9.845 Underflow 3.231e+05 Overflow 0

FE3, Chip 7, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE3, Chip 8, ADC distribution FE3Chip08All

Entries 323352 Mean 1523 RMS 5091 Underflow 0 Overflow 0

FE3, Chip 8, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 10

210

310

410

510

FE3, Chip 8, ADC distribution FE3Chip08Ped

Entries 323352 Mean -0.7663 RMS 0.5881 Underflow 0 Overflow 2.659e+04

FE3, Chip 8, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE3, Chip 9, ADC distribution FE3Chip09All

Entries 323352 Mean 1536 RMS 5128 Underflow 0 Overflow 0

FE3, Chip 9, ADC distribution

10

210

310

410

510

FE3, Chip 9, ADC distribution FE3Chip09Ped

Entries 323352 Mean 2.535 RMS 1.299 Underflow 0 Overflow 2.655e+04

FE3, Chip 9, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE3, Chip 10, ADC distribution FE3Chip10All

Entries 323352 Mean 1581 RMS 5098 Underflow 0 Overflow 0

FE3, Chip 10, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE3, Chip 10, ADC distribution FE3Chip10Ped

Entries 323352 Mean 57.38 RMS 1.341 Underflow 0 Overflow 2.655e+04

FE3, Chip 10, ADC distribution

-5000 0 5000 10000 15000 20000 25000

310

410

510

FE3, Chip 11, ADC distribution FE3Chip11All

Entries 323352 Mean 1535 RMS 5135 Underflow 0 Overflow 0

FE3, Chip 11, ADC distribution

210

310

410

510

FE3, Chip 11, ADC distribution FE3Chip11Ped

Entries 323352 Mean -1.006 RMS 1.042 Underflow 0 Overflow 2.655e+04

FE3, Chip 11, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE4, Chip 0, ADC distribution FE4Chip00All

Entries 323352 Mean 1593 RMS 5299 Underflow 0 Overflow 0

FE4, Chip 0, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE4, Chip 0, ADC distribution FE4Chip00Ped

Entries 323352 Mean -47.12 RMS 1.306 Underflow 0 Overflow 2.867e+04

FE4, Chip 0, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE4, Chip 1, ADC distribution FE4Chip01All

Entries 323352 Mean 1648 RMS 5334 Underflow 0 Overflow 0

FE4, Chip 1, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 10

210

310

410

510

FE4, Chip 1, ADC distribution FE4Chip01Ped

Entries 323352 Mean -15.63 RMS 1.352 Underflow 0 Overflow 2.907e+04

FE4, Chip 1, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE4, Chip 1, ADC distribution FE4Chip01Sig

Entries 323352 Mean 1.881e+04 RMS 4.683 Underflow 3.224e+05 Overflow 0

FE4, Chip 1, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE4, Chip 2, ADC distribution FE4Chip02All

Entries 323352 Mean 1675 RMS 5331 Underflow 0 Overflow 0

FE4, Chip 2, ADC distribution

10

210

310

410

510 FE4, Chip 2, ADC distribution FE4Chip02Ped

Entries 323352 Mean 12.97 RMS 1.35 Underflow 0 Overflow 2.921e+04

FE4, Chip 2, ADC distribution

18800 18900 19000 19100 19200 19300 19400

10

210

FE4, Chip 2, ADC distribution FE4Chip02Sig

Entries 323352 Mean 1.881e+04 RMS 7.429 Underflow 3.22e+05 Overflow 0

FE4, Chip 2, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE4, Chip 3, ADC distribution FE4Chip03All

Entries 323352 Mean 1687 RMS 5346 Underflow 0 Overflow 0

FE4, Chip 3, ADC distribution

310

410

510

FE4, Chip 3, ADC distribution FE4Chip03Ped

Entries 323352 Mean 3.54 RMS 1.293 Underflow 0 Overflow 2.918e+04

FE4, Chip 3, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE4, Chip 4, ADC distribution FE4Chip04All

Entries 323352 Mean 1692 RMS 5350 Underflow 0 Overflow 0

FE4, Chip 4, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE4, Chip 4, ADC distribution FE4Chip04Ped

Entries 323352 Mean 5.229 RMS 1.317 Underflow 0 Overflow 2.929e+04

FE4, Chip 4, ADC distribution

-5000 0 5000 10000 15000 20000 25000 210

310

410

510

FE4, Chip 5, ADC distribution FE4Chip05All

Entries 323352 Mean 1695 RMS 5373 Underflow 0 Overflow 0

FE4, Chip 5, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510

FE4, Chip 5, ADC distribution FE4Chip05Ped

Entries 323352 Mean -0.7117 RMS 1.184 Underflow 0 Overflow 2.93e+04

FE4, Chip 5, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE4, Chip 5, ADC distribution FE4Chip05Sig

Entries 323352 Mean 1.882e+04 RMS 17.85 Underflow 3.227e+05 Overflow 0

FE4, Chip 5, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE4, Chip 6, ADC distribution FE4Chip06All

Entries 323352 Mean 1687 RMS 5330 Underflow 0 Overflow 0

FE4, Chip 6, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510

FE4, Chip 6, ADC distribution FE4Chip06Ped

Entries 323352 Mean 22.83 RMS 1.232 Underflow 0 Overflow 2.903e+04

FE4, Chip 6, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE4, Chip 6, ADC distribution FE4Chip06Sig

Entries 323352 Mean 1.881e+04 RMS 10.63 Underflow 3.225e+05 Overflow 0

FE4, Chip 6, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE4, Chip 7, ADC distribution FE4Chip07All

Entries 323352 Mean 1652 RMS 5303 Underflow 0 Overflow 0

FE4, Chip 7, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 210

310

410

510

FE4, Chip 7, ADC distribution FE4Chip07Ped

Entries 323352 Mean -1.262 RMS 0.6787 Underflow 0 Overflow 2.869e+04

FE4, Chip 7, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE4, Chip 8, ADC distribution FE4Chip08All

Entries 323352 Mean 1635 RMS 5303 Underflow 0 Overflow 0

FE4, Chip 8, ADC distribution

10

210

310

410

510

FE4, Chip 8, ADC distribution FE4Chip08Ped

Entries 323352 Mean -21.92 RMS 1.264 Underflow 0 Overflow 2.878e+04

FE4, Chip 8, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE4, Chip 9, ADC distribution FE4Chip09All

Entries 323352 Mean 1567 RMS 5178 Underflow 0 Overflow 0

FE4, Chip 9, ADC distribution

10

210

310

410

510

FE4, Chip 9, ADC distribution FE4Chip09Ped

Entries 323352 Mean -9.707 RMS 1.26 Underflow 0 Overflow 2.876e+04

FE4, Chip 9, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE4, Chip 10, ADC distribution FE4Chip10All

Entries 323352 Mean 1693 RMS 5337 Underflow 0 Overflow 0

FE4, Chip 10, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE4, Chip 10, ADC distribution FE4Chip10Ped

Entries 323352 Mean 8.974 RMS 1.302 Underflow 0 Overflow 2.93e+04

FE4, Chip 10, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE4, Chip 11, ADC distribution FE4Chip11All

Entries 323352 Mean 1705 RMS 5333 Underflow 0 Overflow 0

FE4, Chip 11, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE4, Chip 11, ADC distribution FE4Chip11Ped

Entries 323352 Mean 21.8 RMS 1.26 Underflow 0 Overflow 2.93e+04

FE4, Chip 11, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE5, Chip 0, ADC distribution FE5Chip00All

Entries 323352 Mean -2345 RMS 6515 Underflow 0 Overflow 0

FE5, Chip 0, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100

10

FE5, Chip 0, ADC distribution FE5Chip00Ped

Entries 323352 Mean 68.04 RMS 44.75 Underflow 2.945e+05 Overflow 2.876e+04

FE5, Chip 0, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE5, Chip 1, ADC distribution FE5Chip01All

Entries 323352 Mean 1631 RMS 5230 Underflow 0 Overflow 0

FE5, Chip 1, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510

FE5, Chip 1, ADC distribution FE5Chip01Ped

Entries 323352 Mean 5.639 RMS 1.354 Underflow 1 Overflow 2.851e+04

FE5, Chip 1, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE5, Chip 2, ADC distribution FE5Chip02All

Entries 323352 Mean -2347 RMS 6506 Underflow 0 Overflow 0

FE5, Chip 2, ADC distribution

-5000 0 5000 10000 15000 20000 25000

10

210

310

410

510

FE5, Chip 3, ADC distribution FE5Chip03All

Entries 323352 Mean -2334 RMS 6521 Underflow 0 Overflow 0

FE5, Chip 3, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100

-2 10

-1 10

1

FE5, Chip 3, ADC distribution FE5Chip03Ped

Entries 323352 Mean 0 RMS -0 Underflow 2.945e+05 Overflow 2.88e+04

FE5, Chip 3, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE5, Chip 4, ADC distribution FE5Chip04All

Entries 323352 Mean 1612 RMS 5217 Underflow 0 Overflow 0

FE5, Chip 4, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE5, Chip 4, ADC distribution FE5Chip04Ped

Entries 323352 Mean 7.778 RMS 1.505 Underflow 0 Overflow 2.855e+04

FE5, Chip 4, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE5, Chip 5, ADC distribution FE5Chip05All

Entries 323352 Mean -2347 RMS 6434 Underflow 0 Overflow 0

FE5, Chip 5, ADC distribution

10

210

310

FE5, Chip 5, ADC distribution FE5Chip05Ped

Entries 323352 Mean 0.6833 RMS 7.074 Underflow 2.925e+05 Overflow 2.878e+04

FE5, Chip 5, ADC distribution

-5000 0 5000 10000 15000 20000 25000

10

210

310

410

510

FE5, Chip 6, ADC distribution FE5Chip06All

Entries 323352 Mean -2334 RMS 6544 Underflow 0 Overflow 0

FE5, Chip 6, ADC distribution

1

10

FE5, Chip 6, ADC distribution FE5Chip06Ped

Entries 323352 Mean 74.15 RMS 1.483 Underflow 2.946e+05 Overflow 2.875e+04

FE5, Chip 6, ADC distribution

-5000 0 5000 10000 15000 20000 25000 210

310

410

510

FE5, Chip 7, ADC distribution FE5Chip07All

Entries 323352 Mean -2336 RMS 6537 Underflow 0 Overflow 0

FE5, Chip 7, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE5, Chip 8, ADC distribution FE5Chip08All

Entries 323352 Mean -2343 RMS 6501 Underflow 0 Overflow 0

FE5, Chip 8, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE5, Chip 9, ADC distribution FE5Chip09All

Entries 323352 Mean 1585 RMS 5247 Underflow 0 Overflow 0

FE5, Chip 9, ADC distribution

210

310

410

510

FE5, Chip 9, ADC distribution FE5Chip09Ped

Entries 323352 Mean 2.286 RMS 1.314 Underflow 2229 Overflow 2.88e+04

FE5, Chip 9, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE5, Chip 10, ADC distribution FE5Chip10All

Entries 323352 Mean 1600 RMS 5230 Underflow 0 Overflow 0

FE5, Chip 10, ADC distribution

210

310

410

510

FE5, Chip 10, ADC distribution FE5Chip10Ped

Entries 323352 Mean 2.613 RMS 1.341 Underflow 966 Overflow 2.831e+04

FE5, Chip 10, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE5, Chip 11, ADC distribution FE5Chip11All

Entries 323352 Mean 1619 RMS 5218 Underflow 0 Overflow 0

FE5, Chip 11, ADC distribution

10

210

310

410

510

FE5, Chip 11, ADC distribution FE5Chip11Ped

Entries 323352 Mean 2.58 RMS 1.633 Underflow 0 Overflow 2.86e+04

FE5, Chip 11, ADC distribution

-5000 0 5000 10000 15000 20000 25000

310

410

510

FE6, Chip 0, ADC distribution FE6Chip00All

Entries 323352 Mean 1647 RMS 5265 Underflow 0 Overflow 0

FE6, Chip 0, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE6, Chip 0, ADC distribution FE6Chip00Ped

Entries 323352 Mean 29.59 RMS 1.329 Underflow 0 Overflow 2.79e+04

FE6, Chip 0, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE6, Chip 0, ADC distribution FE6Chip00Sig

Entries 323352 Mean 1.885e+04 RMS 21.78 Underflow 3.226e+05 Overflow 0

FE6, Chip 0, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE6, Chip 1, ADC distribution FE6Chip01All

Entries 323352 Mean 1624 RMS 5268 Underflow 0 Overflow 0

FE6, Chip 1, ADC distribution

10

210

310

410

510

FE6, Chip 1, ADC distribution FE6Chip01Ped

Entries 323352 Mean 4.737 RMS 1.307 Underflow 0 Overflow 2.79e+04

FE6, Chip 1, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE6, Chip 1, ADC distribution FE6Chip01Sig

Entries 323352 Mean 1.882e+04 RMS 9.538 Underflow 3.227e+05 Overflow 0

FE6, Chip 1, ADC distribution

-5000 0 5000 10000 15000 20000 25000

310

410

510

FE6, Chip 2, ADC distribution FE6Chip02All

Entries 323352 Mean 1633 RMS 5228 Underflow 0 Overflow 0

FE6, Chip 2, ADC distribution

10

210

310

410

510

FE6, Chip 2, ADC distribution FE6Chip02Ped

Entries 323352 Mean 26.55 RMS 1.311 Underflow 0 Overflow 2.79e+04

FE6, Chip 2, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE6, Chip 3, ADC distribution FE6Chip03All

Entries 323352 Mean 1629 RMS 5249 Underflow 0 Overflow 0

FE6, Chip 3, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510

FE6, Chip 3, ADC distribution FE6Chip03Ped

Entries 323352 Mean 23 RMS 1.252 Underflow 0 Overflow 2.782e+04

FE6, Chip 3, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE6, Chip 3, ADC distribution FE6Chip03Sig

Entries 323352 Mean 1.882e+04 RMS 20.02 Underflow 3.221e+05 Overflow 0

FE6, Chip 3, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE6, Chip 4, ADC distribution FE6Chip04All

Entries 323352 Mean 1582 RMS 5189 Underflow 0 Overflow 0

FE6, Chip 4, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE6, Chip 4, ADC distribution FE6Chip04Ped

Entries 323352 Mean 9.734 RMS 1.301 Underflow 0 Overflow 2.743e+04

FE6, Chip 4, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE6, Chip 5, ADC distribution FE6Chip05All

Entries 323352 Mean 1596 RMS 5219 Underflow 0 Overflow 0

FE6, Chip 5, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510

FE6, Chip 5, ADC distribution FE6Chip05Ped

Entries 323352 Mean 10.56 RMS 1.278 Underflow 0 Overflow 2.734e+04

FE6, Chip 5, ADC distribution

18800 18900 19000 19100 19200 19300 19400

-1 10

1

10

FE6, Chip 5, ADC distribution FE6Chip05Sig

Entries 323352 Mean 1.88e+04 RMS 0.453 Underflow 3.233e+05 Overflow 0

FE6, Chip 5, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE6, Chip 6, ADC distribution FE6Chip06All

Entries 323352 Mean 1619 RMS 5267 Underflow 0 Overflow 0

FE6, Chip 6, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 10

210

310

410

510

FE6, Chip 6, ADC distribution FE6Chip06Ped

Entries 323352 Mean 0.5475 RMS 1.234 Underflow 0 Overflow 2.79e+04

FE6, Chip 6, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

FE6, Chip 6, ADC distribution FE6Chip06Sig

Entries 323352 Mean 1.882e+04 RMS 9.482 Underflow 3.228e+05 Overflow 0

FE6, Chip 6, ADC distribution

-5000 0 5000 10000 15000 20000 25000

310

410

510

FE6, Chip 7, ADC distribution FE6Chip07All

Entries 323352 Mean 1577 RMS 5209 Underflow 0 Overflow 0

FE6, Chip 7, ADC distribution

10

210

310

410

510

FE6, Chip 7, ADC distribution FE6Chip07Ped

Entries 323352 Mean -23.4 RMS 1.292 Underflow 0 Overflow 2.79e+04

FE6, Chip 7, ADC distribution

-5000 0 5000 10000 15000 20000 25000

310

410

510

FE6, Chip 8, ADC distribution FE6Chip08All

Entries 323352 Mean 1628 RMS 5246 Underflow 0 Overflow 0

FE6, Chip 8, ADC distribution

10

210

310

410

510 FE6, Chip 8, ADC distribution FE6Chip08Ped

Entries 323352 Mean 15.91 RMS 1.333 Underflow 0 Overflow 2.79e+04

FE6, Chip 8, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE6, Chip 9, ADC distribution FE6Chip09All

Entries 323352 Mean 1576 RMS 5186 Underflow 0 Overflow 0

FE6, Chip 9, ADC distribution

210

310

410

510

FE6, Chip 9, ADC distribution FE6Chip09Ped

Entries 323352 Mean -4.294 RMS 1.333 Underflow 0 Overflow 2.767e+04

FE6, Chip 9, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510 FE6, Chip 10, ADC distribution FE6Chip10All

Entries 323352 Mean 1568 RMS 5168 Underflow 0 Overflow 0

FE6, Chip 10, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE6, Chip 10, ADC distribution FE6Chip10Ped

Entries 323352 Mean -0.1978 RMS 1.073 Underflow 0 Overflow 2.734e+04

FE6, Chip 10, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE6, Chip 11, ADC distribution FE6Chip11All

Entries 323352 Mean 1550 RMS 5194 Underflow 0 Overflow 0

FE6, Chip 11, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE6, Chip 11, ADC distribution FE6Chip11Ped

Entries 323352 Mean -30.69 RMS 1.339 Underflow 0 Overflow 2.748e+04

FE6, Chip 11, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 0, ADC distribution FE7Chip00All

Entries 323352 Mean 1626 RMS 5259 Underflow 0 Overflow 0

FE7, Chip 0, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510

FE7, Chip 0, ADC distribution FE7Chip00Ped

Entries 323352 Mean 11.08 RMS 1.279 Underflow 0 Overflow 2.786e+04

FE7, Chip 0, ADC distribution

18800 18900 19000 19100 19200 19300 19400 -3 10

-2 10

-1 10

1 FE7, Chip 0, ADC distribution FE7Chip00Sig

Entries 323352 Mean 1.882e+04 RMS -0 Underflow 3.234e+05 Overflow 0

FE7, Chip 0, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 1, ADC distribution FE7Chip01All

Entries 323352 Mean 1614 RMS 5245 Underflow 0 Overflow 0

FE7, Chip 1, ADC distribution

210

310

410

510

FE7, Chip 1, ADC distribution FE7Chip01Ped

Entries 323352 Mean 3.151 RMS 1.287 Underflow 0 Overflow 2.786e+04

FE7, Chip 1, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 2, ADC distribution FE7Chip02All

Entries 323352 Mean 1624 RMS 5278 Underflow 0 Overflow 0

FE7, Chip 2, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 210

310

410

510

FE7, Chip 2, ADC distribution FE7Chip02Ped

Entries 323352 Mean 3.411 RMS 1.298 Underflow 0 Overflow 2.786e+04

FE7, Chip 2, ADC distribution

18800 18900 19000 19100 19200 19300 19400 1

10

210

310

410 FE7, Chip 2, ADC distribution FE7Chip02Sig

Entries 323352 Mean 1.881e+04 RMS 6.741 Underflow 2.955e+05 Overflow 0

FE7, Chip 2, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 3, ADC distribution FE7Chip03All

Entries 323352 Mean 1607 RMS 5218 Underflow 0 Overflow 0

FE7, Chip 3, ADC distribution

10

210

310

410

510

FE7, Chip 3, ADC distribution FE7Chip03Ped

Entries 323352 Mean 4.881 RMS 1.289 Underflow 0 Overflow 2.786e+04

FE7, Chip 3, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 4, ADC distribution FE7Chip04All

Entries 323352 Mean 1582 RMS 5236 Underflow 0 Overflow 0

FE7, Chip 4, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510

FE7, Chip 4, ADC distribution FE7Chip04Ped

Entries 323352 Mean -25.67 RMS 1.303 Underflow 0 Overflow 2.786e+04

FE7, Chip 4, ADC distribution

-5000 0 5000 10000 15000 20000 25000 10

210

310

410

510

FE7, Chip 5, ADC distribution FE7Chip05All

Entries 323352 Mean 1618 RMS 5254 Underflow 0 Overflow 0

FE7, Chip 5, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 10

210

310

410

510

FE7, Chip 5, ADC distribution FE7Chip05Ped

Entries 323352 Mean 4.573 RMS 1.308 Underflow 0 Overflow 2.786e+04

FE7, Chip 5, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 6, ADC distribution FE7Chip06All

Entries 323352 Mean 1612 RMS 5251 Underflow 0 Overflow 0

FE7, Chip 6, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE7, Chip 6, ADC distribution FE7Chip06Ped

Entries 323352 Mean 0.08094 RMS 1.178 Underflow 0 Overflow 2.786e+04

FE7, Chip 6, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 7, ADC distribution FE7Chip07All

Entries 323352 Mean 1598 RMS 5209 Underflow 0 Overflow 0

FE7, Chip 7, ADC distribution

10

210

310

410

510

FE7, Chip 7, ADC distribution FE7Chip07Ped

Entries 323352 Mean -1.47 RMS 0.9207 Underflow 0 Overflow 2.786e+04

FE7, Chip 7, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 8, ADC distribution FE7Chip08All

Entries 323352 Mean 1600 RMS 5224 Underflow 0 Overflow 0

FE7, Chip 8, ADC distribution

210

310

410

510

FE7, Chip 8, ADC distribution FE7Chip08Ped

Entries 323352 Mean -4.135 RMS 1.295 Underflow 0 Overflow 2.786e+04

FE7, Chip 8, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 9, ADC distribution FE7Chip09All

Entries 323352 Mean 1609 RMS 5233 Underflow 0 Overflow 0

FE7, Chip 9, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE7, Chip 9, ADC distribution FE7Chip09Ped

Entries 323352 Mean 1.512 RMS 1.317 Underflow 0 Overflow 2.786e+04

FE7, Chip 9, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 10, ADC distribution FE7Chip10All

Entries 323352 Mean 1596 RMS 5239 Underflow 0 Overflow 0

FE7, Chip 10, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 210

310

410

510

FE7, Chip 10, ADC distribution FE7Chip10Ped

Entries 323352 Mean -12.4 RMS 1.281 Underflow 0 Overflow 2.786e+04

FE7, Chip 10, ADC distribution

-5000 0 5000 10000 15000 20000 25000 1

10

210

310

410

510

FE7, Chip 11, ADC distribution FE7Chip11All

Entries 323352 Mean 1626 RMS 5236 Underflow 0 Overflow 0

FE7, Chip 11, ADC distribution

-100 -80 -60 -40 -20 0 20 40 60 80 100 1

10

210

310

410

510 FE7, Chip 11, ADC distribution FE7Chip11Ped

Entries 323352 Mean 19.06 RMS 1.305 Underflow 0 Overflow 2.785e+04

FE7, Chip 11, ADC distribution

0 20 40 60 80 100

-40 -20 0 20 40 60 80 Pedestal vs 12*FE+Chip

0 20 40 60 80 100 0

10

20

30

40

Pedestal RMS vs 12*FE+Chip

0 20 40 60 80 100 0

5000

10000

15000

20000

Raw signal vs 12*FE+Chip

0 20 40 60 80 100 -5 0 5 10 15 20 25 30 35 40 Raw signal RMS vs 12*FE+Chip

0 20 40 60 80 100 0

5000

10000

15000

20000

Signal vs 12*FE+Chip

0 20 40 60 80 100 0 5 10 15 20 25 30 35 40 45 Signal RMS vs 12*FE+Chip